switching fabric controller

1

2

N .

1 2 M..

input ports

output ports inputqueues

output queues

Figure 10.4 Illustration of a crossbar architecture. Although the location of both input and output queues is shown, a given switch usually includes one or the other, but not both. A solid dot indicates a connection (e.g., input port 1 connects to output port 2).