f();g();h()

f();g();h()

f();g();h() .

coordination mechanism

Figure 13.4 Illustration of packet flow through a parallel architecture. If the architecture has N processors, each processor handles approximately 1/N of the traffic.

In a pipeline architecture, each processor performs one operation. Figure 13.5 illustrates the packet flow.

f() g() h ()

Each processor performs one operation as packets flow through the pipeline."