memory bus

RISCProcessor

extract space merge space

Serial Data Processor

(in)

Serial Data Processor (out)

To external DRAM

packets arrive packets leave

Figure 15.14 The internal architecture of a single CP with a RISC core plus functional units to handle ingress and egress. Each C-Port chip contains a total of sixteen CPs.