APP550

PCIbus

Ingress

GMII, SMII, PMA SPI-3, Utopia

coprocessor input (SPI-3)

Egress

GMII, SMII, PMA SPI-3, Utopia

coprocessor output (SPI-3) classif. memory (FCRAM)

statistics memory (DDR-SRAM) scheduler memory (DDR-SRAM) classif. buffer (FCRAM) schedul. buffer (FCRAM)

SED memory (FCRAM)

Figure 17.6 Illustration of the major external connections for an Agere APP550 network processor.