ag_chipset_tchipset_handle; ag_np5_t np_handle; ag_fpp_t fpp_handle; ag_rsp_t rsp_handle; ag_asi_t asi_handle;

Figure 23.2 Example declarations used for the five handles defined by the Agere API. The structure represented by a handle persists across function calls.