stage 6 stage 5 stage 4 stage 3 stage 2 stage 1 clock 1 2 3 4 5 6 7 inst. K inst. K+1 inst. K+2 inst. K+3 inst. K+3 inst. K+3 inst. K+4 inst. K+5 inst. K-1 inst. K inst. K+1 inst. K+2 inst. K+2 inst. K+2 inst. K+3 inst. K+4 inst. K-2 inst. K-1 inst. K inst. K+1 inst. K+1 inst. K+1 inst. K+2 inst. K+3 inst. K-3 inst. K-2 inst. K-1 inst. K - - inst. K+1 inst. K+2 inst. K-4 inst. K-3 inst. K-2 inst. K-1 inst. K - - inst. K+1 inst. K-5 inst. K-4 inst. K-3 inst. K-2 inst. K-1 inst. K - -

Time