ingress

data store processor

SRAM for ingress

data egress data store processor

traffic manag. and sched.

ingress switch interface egress switch interface internal SRAM

Embedded Processor Complex (EPC)

ingress physical MAC multiplexor egress physical MAC multiplexor to switching fabric PCI bus external DRAM and SRAM from switching fabric

egress data store packets from physical devices packets to physical devices

Figure 15.9 The internal architecture of a PowerNP network processor. The high-level diagram hides details such as the structure of the area labeled Embedded Processor Complex and additional external connections.