IXP2xxx IXP2xxx

IXP2xxx

IXP2xxx

GPP GPP

(a) (b)

General-Purpose Processor

Embedded RISC Processors

physical interfaces

Figure 18.1 Illustration of two possible systems designs: (a) a single IXP2xxx that handles multiple network interfaces, and (b) multiple IXP2xxx chips each dedicated to a single network interface. The tasks assigned to the embedded RISC processor depend on the design.