stage 1 stage 2 stage 3 stage 4

stage 5 packets enter the pipeline packets leave the pipeline interstage packet buffer

Figure 8.6 Illustration of a 5-stage data pipeline. The size and complexity of hardware varies among stages because the processing performed by a given stage differs from the processing performed by other stages.