hardware classifier software classifier

. . . . . .

packets arrive for classification exit for unclassified packets packets unrecognized by hardware packets classified into

flowsby hardware packets classified into flowsby software

Figure 9.3 Conceptual architecture of a hybrid classification system. In general, the hardware stage handles standard packets and the software stage handles exceptions.