configuration bus

Fast Pattern Processor (FPP )

Routing Switch Processor (RSP )

Agere System Interface (ASI) packets arrive packets sent to fabric

Figure 15.1 Illustration of Agere’s network processor architecture; three separate chips are interconnected to form a pipeline.