input framer output interface

conf. bus interface functional bus interface data buffer controller

ALU checksum / CRCengine

queue engine pattern engine block buffers and context memory

program memory

control memory data buffer

Figure 15.2 The internal architecture of Agere’s FPP chip. Packets arrive at the input framer, and leave via the output interface.