control iface debug port inter mod. test iface input output packet transform engine external search

interface external memory interface host interface

memory access unit

onboard memory six nP cores policy engine metering engine

Figure 15.7 The internal architecture of AMCC’s nP7510 chip. The chip contains additional interconnections among functional units that are not shown.