wwbump ACE (microblock) ingress ACE (microblock) egress ACE (microblock) input ports output ports

StrongARM

microengine wwbump ACE (core) crosscall client

Figure 26.2 Internal structure of ACEs in the wwbump system and the packet flow among them. Web packets are sent to the StrongARM, and other packets flow directly through to the egress ACE.